From d3995b5248e412dd1b00c06a3f54936326967e2d Mon Sep 17 00:00:00 2001
From: Gerald Combs <gerald@wireshark.org>
Date: Tue, 18 Oct 2016 10:16:39 +0200
Subject: Disable GTK+ by default.
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

I suggested disabling GTK+ by default at Sharkfest EU and no one
objected, hence this patch.

Disable it by default in both Autotools and CMake. Make sure it's
enabled for Debian packaging. The RPM packaging enables GTK3 explicitly
so no change appears to be necessary there.

Change-Id: If5daeaef4bb26cf60006bc8883be15b2cf6c6ae4
Reviewed-on: https://code.wireshark.org/review/18256
Reviewed-by: Peter Wu <peter@lekensteyn.nl>
Petri-Dish: Gerald Combs <gerald@wireshark.org>
Tested-by: Petri Dish Buildbot <buildbot-no-reply@wireshark.org>
Reviewed-by: Jörg Mayer <jmayer@loplof.de>
---
 docbook/release-notes.asciidoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'docbook/release-notes.asciidoc')

diff --git a/docbook/release-notes.asciidoc b/docbook/release-notes.asciidoc
index 9bd215816f..a9594fb84f 100644
--- a/docbook/release-notes.asciidoc
+++ b/docbook/release-notes.asciidoc
@@ -32,6 +32,7 @@ since version 2.2.0:
   That is, you should make sure the NSIS package is completely uninstalled before
   installing the Windows Installer package and vice-versa.
 * Source packages are now compressed using xz instead of bzip2.
+* GTK+ is disabled by default in Autotools and CMake.
 
 //=== Removed Dissectors
 
-- 
cgit v1.2.1

