From e7b6bf3fd83c28a807258892f49e4b1855a7a719 Mon Sep 17 00:00:00 2001
From: Jakub Zawadzki <darkjames-ws@darkjames.pl>
Date: Sun, 7 May 2017 22:00:06 +0200
Subject: Initial OBD-II PIDs dissector.

Change-Id: I0974f13a032a908bcc27f583c3e059f57959881f
Reviewed-on: https://code.wireshark.org/review/21552
Reviewed-by: Michael Mann <mmann78@netscape.net>
Petri-Dish: Michael Mann <mmann78@netscape.net>
Tested-by: Petri Dish Buildbot <buildbot-no-reply@wireshark.org>
Reviewed-by: Jakub Zawadzki <darkjames-ws@darkjames.pl>
---
 docbook/release-notes.asciidoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'docbook/release-notes.asciidoc')

diff --git a/docbook/release-notes.asciidoc b/docbook/release-notes.asciidoc
index fdf8847ede..6e5f8e2964 100644
--- a/docbook/release-notes.asciidoc
+++ b/docbook/release-notes.asciidoc
@@ -96,6 +96,7 @@ NetScaler RPC Protocol
 DirectPlay 8 protocol
 NM protocol
 Netgear Ensemble Protocol
+OBD-II PIDs
 --sort-and-group--
 
 === Updated Protocol Support
-- 
cgit v1.2.1

